By: Marie

Hello I planted 2 dahlia , purchased from the garden centre 7 days ago. They were healthy looking with 4-5 flowers on each. Now they are looking quite wilted and I wonder if they are not liking their new home which is in a large sink trough but is only about 6 inches deep. Would moving to a deeper trough be a good idea.